stability factor, f

s = 1 + τ g / τ L/R shell location normalized by minor radius

(measured from plasma boundary)

δx = 0.9 βp = 0.25 li = 0.8 κx = 1.9

2.0 2.1 2.2

2.3 2.4 2.5

(b)