growth rate, /sec

shell location normalized by minor radius

(measured from plasma boundary)

κx = 1.9

2.0 2.1 2.2 2.3 2.4 2.5

δx = 0.9 βp = 0.25 li = 0.8

tungsten, 3.5 cm thick,ρ = 8 × 10_{-8} ohm-m (a)