0 . 0 0 . 5 1 . 0 1 . 5 2 . 0 2 . 5 3 . 0

Waste Volume (10

3 m

3

)ARIES-II I I I I IVRSS T A T R (m)6 . 8 7 . 5 5 . 6 65 . 5 3 . 2 5 . 2 SiC/Li2ZrO3V/LiF S SiC/Li2OV/LiFS/LiPbSiC/LiPboooF i g 1 0