700 800 900 1000

1100

1200

600 700 800 900 1000

1100

0 0.005 0.01

0.015 0.02

0 0.001 0.002 0.003 0.004 0.005

0.001 0.002 0.003 0.004 0.005 0.006

Temperature (¡C)